\input epsf
\nopagenumbers
\magnification=\magstep1

\rightline{\epsfxsize=2.65in\epsfbox{w2M.eps}} 

\vskip -.87in
\vtop{\hsize=2.7in
\noindent {\bf Problem statement} A child wants to build a tunnel
using three equal boards, each 4 feet wide, one for the top and one
for each side as shown. The two sides are to be tilted at equal angles
$\theta$ to the floor. What is the maximum cross-sectional area $A$
that can be achieved?

}

\vfil\eject\end

